  Aides have access to floor maintenance commands.  NOTE: the term 'current
floor' means the floor that the room you are currently in is associated with.

 *****
  <;A>ide <C>reate floor
 *****
  This command creates a new floor.  The room that you are currently in becomes
a member of the new floor; consequently, you may not create floors in the 
Aide>, Mail>, or Lobby.

 *****
  <;A>ide <D>elete empty floors
 *****
  This command will delete any and all empty floors in the system.

 *****
  <;A>ide <F>loor Moderator
 *****
  This command sets up the moderator for this floor.

 *****
  <;A>ide <I>nvite users
 *****
  This command will invite user(s) to the current floor.

 *****
  <;A>ide <M>ove rooms
 *****
  This command moves rooms from other floors to the floor that you are 
currently on.  The Lobby, Mail>, and Aide> rooms cannot, naturally, be moved
off the base floor.

 *****
  <;A>ide <K>ill floor
 *****
  This command kills the current floor.  When this command is used, you will
be asked if all rooms that are on the current floor should be moved
to the base floor.  Normally they should be moved to the base floor; if you
answer 'N', all rooms on the current floor will be KILLED, along with the
Floor.  Naturally, the base floor cannot be killed.

 *****
  <;A>ide <R>ename floor
 *****
  This command lets you rename the current floor.  You may not rename the 
base floor.

 *****
  <;A>ide <W>ithdraw user
 *****
  This command kicks user(s) off the current floor.

 %AIDE Basic Aide commands.
 %MAINHELP First level help.

